0 100 200 300 400 500 600 700 800 900 1000

-4.9271

TimeSteps

Total Energy

Delta=0.005

0 100 200 300 400 500 600 700 800 900 1000

-4.9286

-4.9286

-4.9285

TimeSteps

Delta=0.001

0 100 200 300 400 500 600 700 800 900 1000

-4.926

-4.9258

-4.9256

TimeSteps

Delta=0.007

0 100 200 300 400 500 600 700 800 900 1000

-4.925

-4.92

-4.915

TimeSteps

Delta=0.010