4 4.5 5 5.5 6 6.5 7 7.5 8

-1553

-1552.5

-1552

-1551.5

-1551

-1550.5

-1550

Density [g/cm^3]

Energy/unit cell [eV]

Cohesive energies of ZrC in NaCl, ZnS, CsCl structures with quadratic fit

NaCl: 0.419379x^2-5.498075x-1534.978880 ZnS: 0.512786x^2-5.369512x-1537.816979 CsCl: 0.334708x^2-4.585749x-1534.799776