1 2 3 4 5 6 7

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 a.u.

Angstrom

Na-Cl Binding Curve

Solid line = Moller- Plesset 2nd- order PT Dashed line = 6- 31G^{**} UHF Mult=1