7.5 8 8.5 9 9.5 10 10.5 11 1

1.2

1.4

1.6

1.8 x 10^{-4}

Weight Percentage of Carbon

Electrical Resistivity [ohm.cm]

Compositional Dependence of ZrC Electrical Resistivity