1 1.2 1.4 1.6 1.8 x 10^{-4} 8

8.5

9

9.5

10

10.5

11

11.5

12

Electrical Resistivity [ohm.cm] κ [W/m/K]

Correlation between Electrical Resistivity and Thermal Conductivity