1400 1500 1600 1700 1800 1900 2000 2100 2200 2300 2400 26

27

28

29

30

31

32

33

34

35

T [K] κ [W/m/K]

Wah Chang Co. ZrC (11.8C), 0.3% free carbon, density = 6.06 g/cm^3