0 0.2 0.4 0.6 0.8 1

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5 0.6

x σxy(x,y=0.0996094)

H_{11}=1, H_{22}=1, R=0.02, ε_{xy}^0 =0.01, mesh_1=512, mesh_2=512 Analytical Fourier